0 5 10 15 20 25 0

5

10

15

20

25

30 WIND9911: Histogram for Wind Speed (1 Hz resolution)

Wind speed [m/s]

Percentage

Range percentage over range

4.50

10.66

15.32 14.70

16.19 15.76

10.73

4.48

2.47 1.73 1.47 1.06 0.66 0.26

00-02 100.00 02-04 95.50 04-06 84.84 06-08 69.51 08-10 54.81 10-12 38.62 12-14 22.86 14-16 12.13 16-18 7.65 18-20 5.17 20-22 3.45 22-24 1.98 24-26 0.91 26-28 0.26