0 5 10 15 20 25 0

5

10

15

20

25

30 WIND9910: Histogram for Wind Speed (1 Hz resolution)

Wind speed [m/s]

Percentage

Range percentage over range

4.01

14.53

18.17

15.58 14.74

12.75

8.79

5.11

2.95 1.69 0.92

0.46 0.22

00-02 100.00 02-04 95.99 04-06 81.46 06-08 63.29 08-10 47.71 10-12 32.97 12-14 20.22 14-16 11.43 16-18 6.32 18-20 3.37 20-22 1.67 22-24 0.76 24-26 0.30