0 5 10 15 20 25 0

5

10

15

20

25

30 WIND9909: Histogram for Wind Speed (1 Hz resolution)

Wind speed [m/s]

Percentage

Range percentage over range

2.04

8.76

22.42 22.72

15.89

13.01

7.36

3.77

2.17 1.03 0.42 0.21 0.14

00-02 100.00 02-04 97.96 04-06 89.21 06-08 66.79 08-10 44.07 10-12 28.18 12-14 15.17 14-16 7.81 16-18 4.03 18-20 1.87 20-22 0.84 22-24 0.42 24-26 0.20